-- --

The current design of the Intrinsics has benefited greatly from the input of several dedicated reviewers in the membership of the X Consortium. In addition to those already mentioned, the following individuals have dedicated significant time to suggesting improvements to the Intrinsics:

Steve Pitschke (Stellar) C. Doug Blewett (AT&T) Bob Miller (HP) David Schiferl (Tektronix) Fred Taft (HP) Michael Squires (Sequent) Marcel Meth (AT&T) Jim Fulton (MIT) Kerry Kimbrough (Texas Instruments) Mike Collins (Digital) Scott McGregor (Digital) Phil Karlton (Digital) Julian Payne (ESS) Jacques Davy (Bull) Gabriel Beged-Dov (HP) Glenn Widener (Tektronix)

Thanks go to each of them for the countless hours spent reviewing drafts and code.

Ralph R. Swick External Research Group Digital Equipment Corporation MIT Project Athena

June, 1988

From Release 3 to Release 4, several new members joined the design team. We greatly appreciate the thoughtful comments, suggestions, lengthy discussions, and in some cases implementation code contributed by each of the following:

Don Alecci (AT&T) Ellis Cohen (OSF) Donna Converse (MIT) Clive Feather (IXI) Nayeem Islam (Sun) Dana Laursen (HP) Keith Packard (MIT) Chris Peterson (MIT) Richard Probst (Sun) Larry Cable (Sun)

Ralph R. Swick

December, 1989